LIBRARY libgoatvr
EXPORTS
	vr_init
	vr_shutdown

	vr_module_count
	vr_module_name

	vr_use_module
	vr_use_module_named

	vr_set_opti
	vr_set_optf
	vr_get_opti
	vr_get_optf

	vr_view_translation
	vr_view_rotation

	vr_view_matrix
	vr_proj_matrix

	vr_begin
	vr_end
	vr_swap_buffers

	vr_output_texture
	vr_output_texture_eye

	vr_recenter